Technical CommitteePICS Proforma of theDS3 Direct MappedPhysical Layer Interfacea f - t e s t - 0 0 8 2 . 0 0 0 May, 1997Copyright release for PICS:This PICS Proforma may be freely reproduced, so that it may be used for its intended purpose.

PICS Proforma for the DS3 Direct MappedPhysical Layer Interfaceaf-test-0082.000May, 1997'1997 The ATM Forum. All Rights Reserved. No part of this publicationmay be reproduced in any form or by any means.The information in this publication is believed to be accurate as of itspublication date. Such information is subject to change without noticeand the ATM Forum is not responsible for any errors. The ATM Forum doesnot assume any responsibility to update or correct any information in thispublication. Notwithstanding anything to the contrary, neither The ATMForum nor the publisher make any representation or warranty, expressedor implied, concerning the completeness, accuracy, or applicability of anyinformation contained in this publication. No liability of any kind shall beassumed by The ATM Forum or the publisher as a result of reliance uponany information contained in this publication.The receipt or any use of this document or its contents does not in anyway create by implication or otherwise:Any express or implied license or right to or under any ATM Forum membercompany�s patent, copyright, trademark or trade secret rights whichare or may be associated with the ideas, techniques, concepts orexpressions contained herein; norAny warranty or representation that any ATM Forum member companieswill announce any product(s) and/or service(s) related thereto, or ifsuch announcements are made, that such announced product(s) and/orservice(s) embody any or all of the ideas, technologies, or conceptscontained herein; norAny form of relationship between any ATM Forum member companies andthe recipient or user of this document.Implementation or use of specific ATM standards or recommendations andATM Forum specifications will be voluntary, and no company shall agree orbe obliged to implement them by virtue of participation in the ATM Forum.The ATM Forum is a non-profit international organization acceleratingindustry cooperation on ATM technology. The ATM Forum does not,expressly or otherwise, endorse or promote any specific products orservices.NOTE: The user’s attention is called to the possibility thatimplementation of the ATM interoperability specification containedherein may require use of an invention covered by patent rights held byATM Forum Member companies or others. By publication of this ATMinteroperability specification, no position is taken by The ATM Forumwith respect to validity of any patent claims or of any patent rightsrelated thereto or the ability to obtain the license to use such rights.ATM Forum Member companies agree to grant licenses under the relevantpatents they own on reasonable and nondiscriminatory terms andconditions to applicants desiring to obtain such a license. For additionalinformation contact:

The ATM ForumWorldwide Headquarters2570 West El Camino RealSuite 304Mountain View, CA 94040Tel: +1 415-949-6700Fax: +1 415-949-6705

AcknowledgementThe editor wishes to acknowledge the efforts of Rick Townsend. Rick submitted the original draftand provided revisions during its development. Thanks also to members of the Physical Layerand Testing Working Groups for their review.Leslie Collica, Editor